╔═════════════════════════════════════════════════════════════════════╗
║                                                                     ║
║                    THE MERCHANT OF VENICE                           ║
║                    WINDOWS 3 INSTALLATION                           ║
║                                                                     ║
║  To run 'Merchant of Venice' from Windows 3, follow these steps:    ║
║  1. copy the file MOV.PIF from the MOV directory to the directory   ║
║     where you keep your Windows PIF files.                          ║
║  2. Run Windows and open the Program manager.                       ║
║  3. Select the group to which you want to add the new programme,    ║
║     for instance Non-Windows Applications, or create a new group.   ║
║  4. Click on FILE/NEW/PROGRAMME ITEM and type MOV.PIF into the      ║
║     dialogue box for file name. For title you may use any name you  ║
║     like. Now click on OK and the title you chose will be added to  ║
║     the programme group, and given a standard DOS icon.             ║
║  5. Select the icon by clicking once on it. Now select              ║
║     FILE/PROPERTIES/CHANGE ICON   When the dialogue box appears,    ║
║     type C:\MOV\MOV.ICO as the file name. Click on OK and the       ║
║     new Merchant of Venice icon will replace the previous one.      ║
║                                                                     ║
╚═════════════════════════════════════════════════════════════════════╝
